MIB: TIMETRA-SYSTEM-MIB
The overall status of an equipped power supply.
For AC multiple powersupplies, this represents the overall status of the second power supplyin the tray (or shelf).
For any other type, this field is unused and set to 'deviceNotEquipped'.
If tmnxChassisPowerSupply2Status is 'deviceStateOk', then all monitored statuses are 'deviceStateOk'.
A value of 'deviceStateFailed' represents a condition where at least one monitored status is in a failed state.